---
title = "Edge Function deploy failed due to an internal error"
topics = [ "functions" ]
keywords = [ "fail", "deploy" ]
database_id = "30b3f7a4-a2b7-4430-8176-31aa4d92b2e9"

[[errors]]
http_status_code = 500
message = "Function deploy failed due to an internal error"

[[errors]]
http_status_code = 500
message = "unexpected deploy status 500"
---

When encountering the `Function deploy failed due to an internal error`, try deploy the function via the [Supabase CLI](/docs/guides/local-development) with the `--debug` flag to gather extra information to identify the possible cause.

You can also try [alternative bundle methods](/docs/reference/cli/supabase-functions-deploy):

- `--use-api`: Use Management API to bundle functions.
- `--use-docker`: Use Docker to bundle functions.

If you're not able to run the CLI or cannot identify the cause, [open a support ticket](/dashboard/support/new).

**Example error**

```
$ supabase functions deploy FUNCTION_NAME --project-ref $PROJECT_ID
```

**Example output with `--debug`**

From the details we can see it is exceeding the 20MB [Edge Function size limit](/docs/guides/functions/limits):

```
$ supabase functions deploy FUNCTION_NAME --project-ref $PROJECT_ID --debug
Deploying Function: FUNCTION_NAME (script size: 62.61MB)
```
